Wearable Technologies Conference Keynote

Wearable Technologies Conference 2017

The WT | Wearable Technologies Conference 2017 is THE must attend event for all decision makers in the industry. On July 25-26, 2017 in San Francisco this event guided attendees through the current status of the wearable market presenting a thrilling conference program, an extensive conference exhibition and networking opportunities with the who’s who from the entire WT ecosystem. For the 6th consecutive year, the event helped to set your focus and give guidance for your business and strategy.

Frederik Hermann held the keynote at WT | Wearable Technologies Conference 2017 EUROPE (in Munich, Germany) as well as the WT | Wearable Technologies Conference 2017 USA (in San Francisco, United States) on the future of wearable technology “What’s Next In Wearable Technology”.

WT | WEARABLE TECHNOLOGIES CONFERENCE 2017 USA | EUROPE | SLIDES

“As an Industry We Need to Further Innovate to Help People Achieve their Goals” | Wearable Technologies AG

The post Wearable Technologies Conference Keynote appeared first on Frederik Hermann.